<!--没登录页面展示-->
<script setup lang="ts">
//调用layouts的方法
const nuxtApp = useNuxtApp()
//窗口的高度
const { getWindowHeight } = useScrollHeight()
const ScrollHeight = ref<number>(getWindowHeight() - 215)
</script>

<template>
  <!--未登录页面-->
  <div class="error-page w-1000px h-100% flex ml-20px" :style="{ height: ScrollHeight + 'px' }">
    <div class="m-auto">
      <img src="@/assets/images/cuowu.png">
      <div class="text-#333 text-24px mt-35px text-center mb-26px">请登录查看</div>
      <div class="handleBtnBorder w-100px h-40px text-14px lh-40px m-auto cursors" @click="nuxtApp.$onHandlerLogin()">登录</div>
    </div>
  </div>
</template>

<style scoped lang="scss">

</style>